#if (IORFLAG == 0)
#if (IORTAPE == 3) /* force to read from double precision archive */
      real*8 temp(n,m,l)
      real*8 fval
#endif
#if (IORTAPE == 2) /* force to read from single precision archive */
      real*4 temp(n,m,l)
      real*4 fval
#endif
#if (IORTAPE == 1)
      dimension temp(n,m,l)
      real fval
#endif
#endif             /* smolar correction */

#if (IORFLAG == 1)
#if (IORTAPE == 3) /* force to read from double precision archive */
      real*8 temp(npa,mpa,l)
      real*8 fval
#endif
#if (IORTAPE == 2) /* force to read from single precision archive */
      real*4 temp(npa,mpa,l)
      real*4 fval
#endif
#if (IORTAPE == 1)
      dimension temp(npa,mpa,l)
      real fval
#endif
#endif             /* smolar correction */
